Too few arguments to function getIP(), 0 passed in C:\xampp\htdocs\goodblox\goodblox\api\gameserver\server.php on line 14 and exactly 1 expected\n@ line 147\nin C:\xampp\htdocs\goodblox\goodblox\core\db.php