SQLSTATE[42000]: Syntax error or access violation: 1064 You have an error in your SQL syntax; check the manual that corresponds to your MariaDB server version for the right syntax to use near 'a' at line 1\n@ line 8\nin C:\xampp\htdocs\goodblox\admin\index.php